An apparent bug in taylor (series)

First invocation returns too many terms ...

> Order;

6

> taylor(sqrt(1+x),x);

1 1 2 x 1 8 x^2 1 16 x^3 5 128 x^4 7 256 x^5 21 1024 x^6 33 2048 x^7 + − + − + − + + ( ) O x^8

... but the second time, the result is correct.

> taylor(sqrt(1+x),x);

+ − + − + + 1 1 2 x 1 8 x^2 1 16 x^3 5 128 x^4 7 256 x^5 ( )

O x^6

Page 1